    NIS and NIS+ Servers

    You can use this module to configure Network Information Servers NIS
    and NIS+ servers. You can configure: master servers (NIS and NIS+),
    slave servers (NIS), and replica servers (NIS+).

    The list box will display all configured NIS and NIS+ servers. Each
    line in the list will show the type, domain, and host name for each
    server.

    From here, you have the option to:

    + Add NIS Server Add an NIS server or slave to your network
    + Add NIS+ Server Add an NIS+ server or replica server to your
      network*
    + Delete Delete all selected NIS configurations

    Note: You must first disable a host as an NIS server or client
    before reconfiguring that host as an NIS+ server or client.

    * NIS+ is only supported on Solaris 2.4 or Solaris 2.5x.

	This window contains the following buttons:

    Add NIS Server

    Click on this button to configure NIS master servers or NIS slave
    servers. The Add NIS Server window will appear..

    Add NIS+ Server

    Click on this button to configure NIS+ master servers or NIS+
    replica servers. The Add NIS+ Server window will appear.

    Delete

    Click on this button to delete a highlighted server configuration
    from the NIS and NIS+ Servers list. The Delete NIS/NIS+ Server
    window will appear.

    Note: Enlighten does NOT automatically detect if a server is a
    master or slave/replica server.
